Form E7 – Reading Experiment/End

Reviewer ID: Date:

This form asks you a few questions about the experiment itself after it is conducted.

General Questions

1. Please assess the explanations before and throughout the training session. [Please mark with an x in the scale]

0 1 2 Training, not enough too explanation enough much 2. Did you need more time than allocated for reviewing the documents? Yes No If yes, please indicate how much time would be sufficient for each document:

3. Would you prefer to review just one document each day? Yes No 4. Did you understand the reading scenario technique after the training sessions? [Please mark with an x in the scale]

0 1 2 3 Understanding none some most all 5. Was there enough training for the reading scenario you got? [Please mark with an x in the scale] 0 1 2 Training not enough too

enough much

6. Did the reading perspective scenario on day 2 help you find defects?

[Please mark with an x in the scale] 0 1 2 3 Scenarios no help little help help help at all a lot

7. Did you follow the reading scenario guideline completely? 0 1 2 Follow not at partially completely guidelines all

8. Please describe how you used the scenario together with the requirements documents!

9. Does the reading scenario miss anything that is important for the specific perspective?

10. Should the questions on the scenarios be more specific in order to provide more help for reading the document according to the relevant perspective? Yes No If yes, how?:

11. Did you find it difficult to review the documents from a perspective different from your usual one? [If you got the same perspective as your usual role, mark ’not relevant’] Yes No Not relevant If yes, how?:

12. Do you think the perspective–based technique is more or less effective (in the sense that more defects are found) than the technique you usually use? [Please mark with an x in the scale]

0 1 2 Technique less equally more effective effective effective

13. What do you think about the forms (E0-E7) used throughout the experiment?

E0

E1

E2

E3

E4

E5

E6

E7

14. What do you think about the size and application domain of requirements documents that are used throughout the experiment? [Please mark with an x in the scale]

(a) Parking Garage 0 1 2 Size too OK too small large

Appropriate application domain?:

(b) ATM System 0 1 2 Size too OK too small large

Appropriate application domain?:

(c) NASA document A 0 1 2 Size too OK too small large

Appropriate application domain?:

(d) NASA document B 0 1 2 Size too OK too small large

Appropriate application domain?:

Comments about the experiment: