Form E5 – Reading Experiment/Defect Report Form

Reviewer ID: page 1 of 1

Document name: ABC Video System

Defects

Defect # Page Class Description

1 8 O Missing functional requirement for handling error cases: What if account # is not found during lookup?

2 9 I Inconsistency with the general requirements: Page 4 specifies a limit on the number of tapes that can be outstanding on rental. Page 9 put the limit on the number of tapes that can be rented at one transaction. These limits are not the same.

3 10 E The policy for filing the physical forms is outside the system currently under consideration and should not be specified here.

4 11 A What it means to ’update the rental’ is never fully specified.

5 13 M Meaningless requirement: ’run on all common computer systems’